From 4eb7532f822c821fb6b69bf103bd075fefba769b Mon Sep 17 00:00:00 2001
From: dujinkim <dujin.kim@dtsolution.co.kr>
Date: Tue, 15 Jul 2025 10:07:09 +0000
Subject: (대표님) 20250715 협력사 정기평가, spreadJS, roles 서비스에 함수 추가
MIME-Version: 1.0
Content-Type: text/plain; charset=UTF-8
Content-Transfer-Encoding: 8bit

---
 lib/evaluation-submit/table/submit-table.tsx | 3 ---
 1 file changed, 3 deletions(-)

(limited to 'lib/evaluation-submit/table/submit-table.tsx')

diff --git a/lib/evaluation-submit/table/submit-table.tsx b/lib/evaluation-submit/table/submit-table.tsx
index 9000c48b..a1d917fd 100644
--- a/lib/evaluation-submit/table/submit-table.tsx
+++ b/lib/evaluation-submit/table/submit-table.tsx
@@ -33,9 +33,6 @@ export function SHIEvaluationSubmissionsTable({ promises }: EvaluationSubmission
     }>({ data: [], pageCount: 0 })
     const router = useRouter()
 
-    console.log(tableData)
-
-
     // 2. 행 액션 상태 관리
     const [rowAction, setRowAction] =
         React.useState<DataTableRowAction<ReviewerEvaluationView> | null>(null)
-- 
cgit v1.2.3

